---
name: "MeatStick V Duo"
subtitle: "Two cordless probes that predict doneness"
date: 2026-07-06
link: "https://www.amazon.com/dp/B0GVJWZFKJ"
linkText: "amazon.com"
source: "Recomendo"
amazonLink: "https://www.amazon.com/dp/B0GVJWZFKJ"
topics: [home-and-kitchen, food-and-drink]
tags: [kitchen, cooking, gadget, giftable]
description: "A pair of fully wireless meat probes rated to 1200°F whose app predicts doneness for two cuts at once, so you never lift the lid to spot-check."
---

Two fully wireless probes, each rated to 1200°F so they survive an open grill, let you track two different cuts at once while the app predicts doneness for each — no opening the lid to check. The prediction is the trick: it tells you when to pull the meat before it gets there, not after. Cords were always the weak point of a leave-in thermometer, and these have none.
